-- cytx_api 初始化脚本
-- 数据库：pap_cytx
-- 需要的表：admin_user, admin_role, operation_log

CREATE DATABASE IF NOT EXISTS `pap_cytx` DEFAULT CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci;
USE `pap_cytx`;

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ========================================
-- 管理员用户表
-- ========================================
CREATE TABLE IF NOT EXISTS `admin_user` (
  `id` int unsigned NOT NULL AUTO_INCREMENT,
  `username` varchar(50) NOT NULL COMMENT '用户名',
  `password` varchar(64) NOT NULL COMMENT '密码(MD5)',
  `nickname` varchar(50) DEFAULT '' COMMENT '昵称',
  `avatar` varchar(255) DEFAULT '' COMMENT '头像',
  `email` varchar(100) DEFAULT '' COMMENT '邮箱',
  `phone` varchar(20) DEFAULT '' COMMENT '手机号',
  `role_id` int unsigned DEFAULT 0 COMMENT '角色ID',
  `last_login_time` datetime DEFAULT NULL COMMENT '最后登录时间',
  `last_login_ip` varchar(50) DEFAULT '' COMMENT '最后登录IP',
  `login_fail_count` int DEFAULT 0 COMMENT '当日登录失败次数',
  `login_fail_date` date DEFAULT NULL COMMENT '最后登录失败日期',
  `status` tinyint(1) DEFAULT 1 COMMENT '状态: 1启用 0停用',
  `is_deleted` tinyint(1) DEFAULT 0 COMMENT '软删除: 0正常 1已删除',
  `create_by` int unsigned DEFAULT 0 COMMENT '创建人ID',
  `update_by` int unsigned DEFAULT 0 COMMENT '修改人ID',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_time` datetime DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_username` (`username`),
  KEY `idx_role_id` (`role_id`),
  KEY `idx_status` (`status`),
  KEY `idx_is_deleted` (`is_deleted`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='管理员用户表';

-- ========================================
-- 角色表
-- ========================================
CREATE TABLE IF NOT EXISTS `admin_role` (
  `id` int unsigned NOT NULL AUTO_INCREMENT,
  `name` varchar(50) NOT NULL COMMENT '角色名称',
  `code` varchar(50) DEFAULT '' COMMENT '角色编码',
  `description` varchar(200) DEFAULT '' COMMENT '角色描述',
  `permissions` json DEFAULT NULL COMMENT '权限列表(JSON)',
  `is_default` tinyint(1) DEFAULT 0 COMMENT '是否默认角色: 0否 1是',
  `sort` int DEFAULT 0 COMMENT '排序',
  `status` tinyint(1) DEFAULT 1 COMMENT '状态: 1启用 0停用',
  `is_deleted` tinyint(1) DEFAULT 0 COMMENT '软删除: 0正常 1已删除',
  `create_by` int unsigned DEFAULT 0 COMMENT '创建人ID',
  `update_by` int unsigned DEFAULT 0 COMMENT '修改人ID',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_time` datetime DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  PRIMARY KEY (`id`),
  KEY `idx_status` (`status`),
  KEY `idx_is_deleted` (`is_deleted`),
  KEY `idx_sort` (`sort`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='角色表';

-- ========================================
-- 操作日志表
-- ========================================
CREATE TABLE IF NOT EXISTS `operation_log` (
  `id` int NOT NULL AUTO_INCREMENT,
  `user_id` int DEFAULT 0 COMMENT '操作人ID',
  `username` varchar(50) DEFAULT '' COMMENT '操作人用户名',
  `action` varchar(20) DEFAULT '' COMMENT '操作类型: login/logout/add/edit/delete/export',
  `module` varchar(50) DEFAULT '' COMMENT '操作模块',
  `description` varchar(500) DEFAULT '' COMMENT '操作描述',
  `ip` varchar(50) DEFAULT '' COMMENT 'IP地址',
  `user_agent` varchar(500) DEFAULT '' COMMENT '浏览器UA',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`),
  KEY `idx_user` (`user_id`),
  KEY `idx_action` (`action`),
  KEY `idx_time` (`create_time`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='操作日志';

-- ========================================
-- 患者表
-- ========================================
CREATE TABLE IF NOT EXISTS `patient` (
  `id` int unsigned NOT NULL AUTO_INCREMENT,
  `patient_no` varchar(30) NOT NULL COMMENT '患者编号(YYYYMM+雪花ID)',
  `name` varchar(50) NOT NULL COMMENT '姓名',
  `phone` varchar(20) NOT NULL COMMENT '手机号',
  `id_card` varchar(18) NOT NULL COMMENT '身份证号',
  `gender` varchar(4) DEFAULT '' COMMENT '性别',
  `birth_date` date DEFAULT NULL COMMENT '出生日期',
  `province_code` varchar(6) DEFAULT '' COMMENT '省编码',
  `city_code` varchar(6) DEFAULT '' COMMENT '市编码',
  `district_code` varchar(6) DEFAULT '' COMMENT '区编码',
  `address` varchar(255) DEFAULT '' COMMENT '详细地址',
  `tag` varchar(50) DEFAULT '' COMMENT '标识(如直肠癌)',
  `documents` json DEFAULT NULL COMMENT '上传资料(检查报告等)JSON数组',
  `sign_income` varchar(255) DEFAULT '' COMMENT '个人可支配收入声明文件URL',
  `sign_privacy` varchar(255) DEFAULT '' COMMENT '个人信息处理同意书文件URL',
  `sign_promise` varchar(255) DEFAULT '' COMMENT '声明与承诺文件URL',
  `status` tinyint(1) DEFAULT 0 COMMENT '状态: 0待审核 1审核通过 2已驳回',
  `is_deleted` tinyint(1) DEFAULT 0 COMMENT '软删除: 0正常 1已删除',
  `create_by` int unsigned DEFAULT 0 COMMENT '创建人ID',
  `update_by` int unsigned DEFAULT 0 COMMENT '修改人ID',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_time` datetime DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_patient_no` (`patient_no`),
  KEY `idx_status` (`status`),
  KEY `idx_is_deleted` (`is_deleted`),
  KEY `idx_phone` (`phone`),
  KEY `idx_id_card` (`id_card`),
  KEY `idx_tag` (`tag`),
  KEY `idx_create_time` (`create_time`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='患者表';

-- ========================================
-- 患者审核记录表
-- ========================================
CREATE TABLE IF NOT EXISTS `patient_audit` (
  `id` int unsigned NOT NULL AUTO_INCREMENT,
  `patient_id` int unsigned NOT NULL COMMENT '患者ID',
  `action` varchar(20) NOT NULL COMMENT '操作: submit/approve/reject',
  `reason` varchar(500) DEFAULT '' COMMENT '驳回原因',
  `operator_id` int unsigned DEFAULT 0 COMMENT '操作人ID',
  `operator_name` varchar(50) DEFAULT '' COMMENT '操作人姓名',
  `is_deleted` tinyint(1) DEFAULT 0 COMMENT '软删除: 0正常 1已删除',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '操作时间',
  PRIMARY KEY (`id`),
  KEY `idx_patient_id` (`patient_id`),
  KEY `idx_action` (`action`),
  KEY `idx_is_deleted` (`is_deleted`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='患者审核记录表';

-- ========================================
-- 初始化数据
-- ========================================

-- 默认角色
INSERT INTO `admin_role` (`id`, `name`, `code`, `description`, `permissions`, `is_default`, `sort`) VALUES
(1, '超级管理员', 'ADMIN', '拥有所有权限', '["*"]', 1, 1);

-- 默认管理员 (密码: Admin123)
INSERT INTO `admin_user` (`username`, `password`, `nickname`, `role_id`) VALUES
('admin', '0192023a7bbd73250516f069df18b500', '超级管理员', 1);

SET FOREIGN_KEY_CHECKS = 1;
